ATLAS SCT Module Test - Wed Feb 06 15:45:17 2002 - RAL - Module 20220170100042 Run 330 Scan 53 Module 0 Link 0 - THRESHOLD (mV) from 0.00mV to 150.00mV in 2.50mV steps, total 61 points

Chip 0 Chip 1 Chip 2 Chip 3 Chip 4 Chip 5

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal0_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal0_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal0_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal0_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal0_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal0_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal1_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal1_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal1_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal1_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal1_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal1_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal2_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal2_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal2_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal2_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal2_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal2_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal3_{Nent = 0}

THRESHOLD (mV)

0 20 40 60 80 100 120 140 0

0.2

0.4

0.6

0.8

1

Nent = 0

scurves cal3_{Nent = 0}