13101410

3000

3050

3215

38800102 (17)

3090

160P.Ingenito. 06-dec-96.

102 Crystals in Ecal Barrel = 17 Trigger towers

600x150x450

19301910

EE / PPEB / PP 53�

1900

29502700HE/EE/SE : 20 - CL : 20 - TK/SB/EB/HB : 100Crack 140 mm total

h = 1.131 h = 1.479 h = 1.566 h = 1.653 h = 2.610h = 3.000

3250CMS ECALInterface EB / EE