Status

Series Detector Testing at Valencia- Status on 24/1/02

Testing completed Testing in progress Not yet received

Delivery Number IV Visual Strip Depletion

Rejected/Damage Problems Data To be rep. Others For mod.

06.02.01 10 10 10 2 10 2 2 2 2 2 0 0 1 10 19.03.01 20 20 20 2 20 2 2 1 2 1 0 1 1 19 26.03.01 15 15 15 1 15 1 1 1 1 1 0 0 1 15 10.04.01 15 15 15 1 15 1 1 1 1 1 0 0 0 15 12.06.01 30 30 30 3 3 3 3 1 3 1 0 0 0 30 31.07.01 29 29 29 2 3 2 2 1 2 1 0 1 0 28 9.01.02 32 3 Totals: 151 119 119 11 69 11 11 7 11 7 0 2 3 117 % 100 78.81 78.81 7.28 45.7 7.28 7.28 4.64 7.28 4.64 0 1.32 1.99 77.48

• Detectors received : 554 (81.5%) Now in schedule after some delay • Detectors tested : 432 (63.5%) Last 122 detectors just received

Color codes:

I. Hamamatsu W32

Instability Ccoupling Rseries Rpoly Cis

Availables

Status

Delivery Number IV Visual Strip Depletion

Rejected/Damage Problems Data To be rep. Others For mod.

06.02.01 10 10 10 2 10 2 2 2 2 2 0 0 0 10 19.03.01 20 20 20 2 20 2 2 1 2 1 0 0 1 20 26.03.01 30 30 30 3 30 3 3 1 3 1 0 1 2 29 04.06.01 13 13 13 1 2 1 1 1 1 1 0 0 0 13 19.06.01 8 8 8 1 3 1 1 1 1 1 0 0 0 8 24.07.01 9 9 9 0 1 0 0 0 0 0 0 0 0 9 31.7.01 23 23 23 3 4 3 3 2 3 2 0 0 0 23 9.01.02 50 36 36 5 Totals: 163 149 149 12 75 12 12 8 12 8 0 1 3 112 % 100 91.41 91.41 7.36 46.01 7.36 7.36 4.91 7.36 4.91 0 0.61 1.84 68.71

Delivery Number IV Visual Strip Depletion

Rejected/Damage Problems Data To be rep. Others For mod.

19.03.01 20 20 20 2 20 2 2 2 2 2 0 0 2 20 21.05.01 10 10 10 1 1 1 1 1 1 1 0 0 0 10 26.06.01 30 30 30 3 4 3 3 1 3 1 0 1 1 29 28.08.01 20 20 20 1 2 1 1 1 1 1 0 0 0 20 29.09.01 20 20 20 2 2 2 2 1 2 1 0 0 0 20 9.01.02 20 20 20 2 Totals: 120 120 120 9 31 9 9 6 9 6 0 1 3 99 % 100 100 100 7.5 25.83 7.5 7.5 5 7.5 5 0 0.83 2.5 82.5

II. Hamamatsu W31

Instability Ccoupling Rseries Rpoly Cis

Availables

III. Hamamatsu W22

Instability Ccoupling Rseries Rpoly Cis

Availables

Status

Delivery Number IV Visual Strip Depletion Instability

Rejected/Damage Problems Data To be rep. Others For mod.

19.03.01 3 3 3 1 3 1 1 1 1 1 0 0 0 3 21.05.01 10 10 10 1 1 1 1 1 1 1 0 0 0 10 19.06.01 27 27 27 3 4 3 3 1 3 1 0 0 1 27 26.06.01 2 2 2 0 1 0 0 0 0 0 0 0 0 2 10.07.01 18 18 18 2 3 2 2 1 2 1 0 0 0 18 18.09.01 14 14 14 1 2 1 1 1 1 1 0 1 0 13 11.10.01 6 6 6 1 3 1 1 1 1 1 0 0 0 6 29.09.01 20 20 20 2 2 2 2 1 2 1 1 0 0 19 9.01.02 20 20 20 2 Totals: 120 120 120 11 21 11 11 7 11 7 1 1 1 98 % 100 100 100 9.17 17.5 9.17 9.17 5.83 9.17 5.83 0.83 0.83 0.83 81.67

TOTAL 554 508 508 43 196 43 43 28 43 28 1 5 10 426

% 100 91.7 91.7 7.76 35.38 7.76 7.76 5.05 7.76 5.05 0.18 0.9 1.81 76.9

IV. Hamamatsu W21

Ccoupling Rseries Rpoly Cis

Availables

No problems in the last deliveries ( only 1 detector returned to Hamamatsu due to

"foreign article" over the strips)